
\input xy.tex
\xyoption{graph}
\xyoption{ps}
\xygraph{ !{0;<1cm,0cm>:}
[]="O"
"O"
[r(1.99829269090116)] [u(0.6456208806188)]{	c}="v1"
"O"
[r(0.0132221989059958)] [u(2.09995837421985)]{	w}="v2"
"O"
[r(-1.9900043882081)] [u(0.670732834228726)]{	a}="v3"
"O"
[r(-1.26065152947727)] [u(-1.67951115543381)]{	q}="v4"
"O"
[r(1.19976809384721)] [u(-1.72353024951297)]{	u}="v5"
"O"
[r(0.951567948048172)] [u(0.307438514580381)]{	v}="v6"
"O"
[r(0.00629628519333134)] [u(0.99998017819993)]{	b}="v7"
"O"
[r(-0.947621137241953)] [u(0.319396587727965)]{	r}="v8"
"O"
[r(-0.600310252132033)] [u(-0.799767216873244)]{	s}="v9"
"O"
[r(0.571318139927243)] [u(-0.82072869024427)]{	t}="v10"
"v1"-"v2"
"v2"-"v3"
"v3"-"v4"
"v4"-"v5"
"v5"-"v1"
"v1"-"v6"
"v2"-"v7"
"v3"-"v8"
"v4"-"v9"
"v5"-"v10"
"v6"-"v8"
"v7"-"v9"
"v8"-"v10"
"v9"-"v6"
"v10"-"v7"
}
\end
